Submillimeter Telescope Observatory

Heinrich-Hertz Telescope

A Collaboration of Steward Observatory and the Max-Planck-Institut für Radioastronomie

Proposal Summary Sheet

For official use Date:

Proposal number:

Submitted to: SO MPIfR Joint proposal: Specify % time MPIfR: SO: SMTO (Staff)

TITLE:

ABSTRACT:

Investigator(s): Institution: Email: Phone: Fax:

Expected observer:

Number of hours requested: LST interval(s):

Scientific Category: extragalactic young stellar objects Observing Mode: continuum galactic cloud structure spectroscopy planetary stellar other: atmospheric chemistry

Objects Name: Coordinates: V_{LSR}:

Frequencies:

Special requirements (dates, frequencies, etc.):

Spectral Line Receivers: 230 GHz SIS 345 GHz Dual Channel SIS 460 GHz SIS 810 GHz HEB Bolometer channels: 19 channel (870 μm) Backends: AOS-1 (1 GHz) AOS-2 (1 GHz) AOS-3 (250 MHz) Filterbanks Drumbeat