Plot file version 1 created 14-JUN-2011 11:35:12 G105.42+ BR145S1.G05LIN.2 Freq = 22.2339 GHz, Bw = 8.000 MH Calibrated with CL # 8 but no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged

Ampl Jy

KM/S (LSR)

10 0 -10 -20 -30 -40

35

30

25

20

15

10

5

0 IF 1(I)