Plot file version 1 created 12-SEP-2014 17:34:26 G043.03- G043.03-0.45.SPT-2.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged

Ampl Jy

KM/S (LSR)

-20 0 20 40 60 80 100 120 140

4.1 4.0 3.9 3.8 3.7 3.6 3.5 3.4 3.3 3.2 3.1 IF 1(I)