Plot file version 1 created 24-DEC-2013 14:13:11 G035.20- G035.20-1.73.SPT-1.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged

Ampl Jy

KM/S (LSR)

-300 -200 -100 0 100 200 300 400

30

25

20

15

10

5

0 IF 1(I)