Plot file version 1 created 06-FEB-2015 09:24:12 G034.41+ G034.41+0.23.SPLIT.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged

Ampl Jy

KM/S (LSR)

-50 0 50 100 150

400

350

300

250

200

150

100

50

0 IF 1(I)