Plot file version 1 created 13-FEB-2015 16:47:51 G032.79+ G032.79+0.19.SPLIT.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged

Ampl Jy

KM/S (LSR)

-30 -20 -10 0 10 20 30 40 50

90

80

70

60

50

40

30

20

10

0 IF 1(I)